	\begin{longtable}{p{1.5cm}p{12cm}}
		\hline
		\multicolumn{1}{c}{{\textbf{Section} \texttt{integration}}} & \multicolumn{1}{c}{{\textbf{Description}}} \\ 
		\hline
		\texttt{usesobol} & When \texttt{.true.} and the number of MPI processes is a power of two, the Sobol 
		sequence is used, see ref.~\cite{MCFM9}, otherwise the MT19937 pseudo random number generator. \\
		\texttt{seed} & Initialization seed for MT19937 pseudo random number generator. \\
		\texttt{precisiongoal} & Relative precision goal for the integration. \\
		\texttt{readin} & When \texttt{.true.} the automatically written snapshot from a previous run will be read-in
		to resume the integration. \\
		\texttt{writeintermediate} & When \texttt{.true.} histograms are written after each Vegas iteration. \\
		\texttt{warmupprecisiongoal} & Sets the relative precision goal for the warmup run. Unless this precision
		is reached, the number of calls for the warmup is increased. \\
		\texttt{warmupchisqgoal} & Sets the $\chi^2$ per iteration goal for the warmup run. Unless the 
		$\chi^2/\text{it.}$ of the warmup is below this target, the number of calls for the warmup is increased. \\
		\hline
	\end{longtable}
\clearpage
